X-Git-Url: https://git.cweiske.de/anoweco.git/blobdiff_plain/a9d650a45c62c311b36b229702079bca1c3bb715..e876f47024e8a73e901a6be3193c4f611ede9088:/data/schema.sql?ds=sidebyside

diff --git a/data/schema.sql b/data/schema.sql
index 25e7cad..2861787 100644
--- a/data/schema.sql
+++ b/data/schema.sql
@@ -15,7 +15,6 @@ CREATE TABLE `comments` (
 CREATE TABLE `users` (
   `user_id` int(11) NOT NULL AUTO_INCREMENT,
   `user_name` varchar(128) NOT NULL,
-  `user_email` varchar(256) NOT NULL,
   `user_imageurl` varchar(1024) NOT NULL,
   PRIMARY KEY (`user_id`)
 ) ENGINE=InnoDB DEFAULT CHARSET=utf8;
