X-Git-Url: https://git.cweiske.de/anoweco.git/blobdiff_plain/ccb7bb3c75555c01e7dbc78e0b971abc86f3a59d..adde8658ef641287cabdd04fecd8f8ae694f325c:/data/schema.sql

diff --git a/data/schema.sql b/data/schema.sql
index 61eae79..e69c150 100644
--- a/data/schema.sql
+++ b/data/schema.sql
@@ -8,16 +8,16 @@ CREATE TABLE `comments` (
   `comment_of_url` varchar(2048) NOT NULL,
   `comment_type` varchar(32) NOT NULL,
   `comment_json` mediumtext NOT NULL,
+  `comment_pingstate` varchar(6) NOT NULL,
   PRIMARY KEY (`comment_id`)
-) ENGINE=InnoDB AUTO_INCREMENT=8 DEFAULT CHARSET=utf8;
+) ENGINE=InnoDB DEFAULT CHARSET=utf8;
 
 
 CREATE TABLE `users` (
   `user_id` int(11) NOT NULL AUTO_INCREMENT,
   `user_name` varchar(128) NOT NULL,
-  `user_email` varchar(256) NOT NULL,
   `user_imageurl` varchar(1024) NOT NULL,
   PRIMARY KEY (`user_id`)
-) ENGINE=InnoDB AUTO_INCREMENT=2 DEFAULT CHARSET=utf8;
+) ENGINE=InnoDB DEFAULT CHARSET=utf8;
 
 
